-202468101214161820

Insitu Temperature (˚C)

33.2 33.6 34.0 34.4 34.8 35.2 35.6 Salinity (PSU)

27 27.5 28 28.5

26 26.5 27

24.5 25 25.5 26

26.5

27

25 25.5 26 26.5

27

27.5

28

Float 5281 (All profiles as of 02 Jan 2023)