1408324896.5919028

-2.0-1.5-1.0-0.50.00.51.01.5

Insitu Temperature (˚C)

32.4 32.8 33.2 33.6 34.0 34.4 34.8

Salinity (PSU)

26.5 27 27.5

-400 -200 0 200 400 600 800

Oxygen Concentration (μm/kg)

Float 5250 (All profiles as of 17 Aug 2014)