1408323231.5919028

246810121416182022

Insitu Temperature (˚C)

34.00 34.25 34.50 34.75 35.00 35.25 35.50 35.75

Salinity (PSU)

26.5 27 27.5

23.5 24 24.5 25 25.5

26

26.5

27

24.5 25 25.5 26 26.5

27

27.5

Float 5173 (All profiles as of 17 Aug 2014)