0 5 10 15 20 25 30 35 Salinity (PSU)

1515.51616.51717.51818.51919.52020.52121.52222.52323.52424.52525.52626.5

25

25.5

26

26.5

27

26

26.5

27

27.5

0 50 100 150 200 250 300

O_2 Concentration (μm/kg)

0 10 20 30 40 50

Nitrate Concentration (μm/kg)

234567891011121314151617

Insitu Temperature (˚C)

Float 5143 (All profiles as of 14 Oct 2020)