1408321632.5919028

2525.52626.52727.52828.52929.53030.53131.53232.53333.53434.535 26

26.5

27

27

27.5

28 123456789101112

Insitu Temperature (˚C)

32 36 40 44 48 52

Salinity (PSU)

125 150 175 200 225 250 275 300

O_2 Concentration (μm/kg)

Float 5072 (All profiles as of 17 Aug 2014)