1416315241.5919028

23456789101112131415161718

Insitu Temperature (˚C)

33.6 33.8 34.0 34.2 34.4 34.6 34.8

Salinity (PSU)

26 26.5

25

25.5

26

26.5

27

Insitu Temperature (˚C)

33.6 33.8 34.0 34.2 34.4 34.6 34.8

Salinity (PSU)

Insitu Temperature (˚C)

Salinity (PSU)

Float 3287 (All profiles as of 18 Nov 2014)