1455568398.5919028

123456789101112131415

Insitu Temperature (˚C)

32.0 32.5 33.0 33.5 34.0 34.5 35.0

Salinity (PSU)

25 25.5 26 26.5

25.5

26

26.5

27

26

26.5

27

27.5

28

Float 2790 (All profiles as of 15 Feb 2016)