4.04.55.05.56.06.57.07.58.08.59.09.510.0

Insitu Temperature (˚C)

34.30 34.35 34.40 34.45 34.50 34.55 34.60 34.65 34.70 Salinity (PSU)

26.5

Float 23753 (All profiles as of 05 Dec 2025)