33.8 34.0 34.2 34.4 34.6 34.8 Salinity (PSU)

27.5

27

0 50 100 150 200 250 300

O_2 Concentration (μm/kg)

0 10 20 30 40 50

Nitrate Concentration (μm/kg)

-1.0-0.50.00.51.01.52.02.53.03.54.04.55.05.56.06.5

Insitu Temperature (˚C)

Float 23482 (All profiles as of 19 Feb 2026)