1408319252.5919028

27.5

26.5

0246810121416182022

Insitu Temperature (˚C)

34.1 34.2 34.3 34.4 34.5 34.6 34.7 34.8

Salinity (PSU)

130 140 150 160 170 180 190 200 210 220 230 240 250 260 270

Oxygen Concentration (μm/kg)

Oxygen Concentration (μm/kg)

130 140 150 160 170 180 190 200 210 220 230 240 250 260 270

Float 2346 (All profiles as of 17 Aug 2014)