28.25

28.50

28.75

29.00

29.25

29.50

29.75

30.00

30.25

30.50

30.75

31.00

Insitu Temperature (˚C)

34.25 34.26 34.27 34.28 34.29 34.30 Salinity (PSU)

Float 23218 (All profiles as of 13 Feb 2026)