0200400600800

1000

1200

1400

1600

1800

2000

2200

Pressure (decibar)

33.033.534.034.535.035.536.036.5 Salinity (PSU)

Float: 21874 Profile: 103 Location: 12.7˚S -102.2˚E Date: 11/11/2025

05101520253035

Insitu Temperature (˚C)

32333435363738

Salinity (PSU)