0200400600800

1000

1200

1400

1600

1800

2000

2200

Pressure (decibar)

33.634.034.434.835.235.636.036.4 Salinity (PSU)

Float: 21874 Profile: 079 Location: 13.0˚S -104.6˚E Date: 03/08/2025

05101520253035

Insitu Temperature (˚C)

32333435363738

Salinity (PSU)