024681012141618202224

Insitu Temperature (˚C)

32.4 32.8 33.2 33.6 34.0 34.4 34.8 Salinity (PSU)

26.5 27 27.5

25 25.5 26 26.5

23 23.5 24 24.5 25 25.5

26

26.5

27

Float 21674 (All profiles as of 02 May 2024)