1408318398.5919028

2.02.53.03.54.04.55.05.56.06.57.07.58.08.59.09.5

Insitu Temperature (˚C)

33.25 33.50 33.75 34.00 34.25 34.50 34.75

Salinity (PSU)

26.5

27

Float 2163 (All profiles as of 17 Aug 2014)