2345678910111213141516

Insitu Temperature (˚C)

33.75 34.00 34.25 34.50 34.75 35.00 35.25 35.50 Salinity (PSU)

26 26.5 27

25

25.5

26

26.5

27

26

26.5

27

27.5

Float 18567 (All profiles as of 13 Apr 2024)