34.1 34.2 34.3 34.4 34.5 34.6 34.7 Salinity (PSU)

27.5

26.5

0 50 100 150 200 250 300

O_2 Concentration (μm/kg)

0 10 20 30 40 50

Nitrate Concentration (μm/kg)

-20246810121416

Insitu Temperature (˚C)

Float 17328 (All profiles as of 25 Mar 2024)