24681012141618202224

Insitu Temperature (˚C)

33.75 34.00 34.25 34.50 34.75 35.00 35.25 Salinity (PSU)

26 26.5 27

23 23.5 24 24.5 25 25.5

26

26.5

27

24 24.5 25 25.5 26 26.5

27

27.5

Float 17010 (All profiles as of 12 Apr 2024)