-202468101214161820

Insitu Temperature (˚C)

-5 0 5 10 15 20 25 30 35 40 Salinity (PSU)

1515.51616.51717.51818.51919.52020.52121.52222.52323.52424.52525.52626.52727.52828.52929.53030.53131.532

1515.51616.51717.51818.51919.52020.52121.52222.52323.52424.52525.52626.52727.52828.52929.53030.5

24.5 25 25.5 26

26.5

27

25 25.5 26 26.5

27

27.5

28

0 50 100 150 200 250 300

O_2 Concentration (μm/kg)

Float 12430 (All profiles as of 27 Apr 2024)