-2-1012345678

Insitu Temperature (˚C)

33.6 33.8 34.0 34.2 34.4 34.6 34.8 Salinity (PSU)

27 27.5

26.5

27

0 100 200 300 400

O_2 Concentration (μm/kg)

Float 12395 (All profiles as of 15 May 2020)