33.9 34.0 34.1 34.2 34.3 34.4 34.5 34.6 34.7 34.8 Salinity (PSU)

27.5

0 50 100 150 200 250 300

O_2 Concentration (μm/kg)

0 10 20 30 40 50

Nitrate Concentration (μm/kg)

-1.00

-0.75

-0.50

-0.250.000.250.500.751.001.251.50

Insitu Temperature (˚C)

Float 12378 (All profiles as of 26 Jun 2017)