246810121416182022

Insitu Temperature (˚C)

34.0 34.4 34.8 35.2 35.6 36.0 36.4 Salinity (PSU)

26.5 27 27.5 28

23.5 24 24.5 25 25.5

26

26.5

27

24.5 25 25.5 26 26.5

27

27.5

Float 10992 (All profiles as of 06 Jul 2025)