05101520253035404550556065

Insitu Temperature (˚C)

30 35 40 45 50 55 60 65

Salinity (PSU)

24.52525.52626.52727.52828.52929.53030.53131.53232.53333.53434.535

23.52424.52525.52626.52727.52828.52929.53030.53131.53232.53333.53434.535

1515.5

1616.5 17 17.5 18 18.5 19 19.5 20 20.5 21 21.5 22 22.5 23 23.5 24 24.5 25 25.5 26 26.5 27

1515.5 1616.5 1717.5

1818.5 19 19.5 20 20.5 21 21.5 22 22.5 23 23.5 24 24.5 25 25.5 26 26.5 27 27.5 28

Float 10485 (All profiles as of 31 Jul 2020)