1408315074.5919028

1234567891011121314

Insitu Temperature (˚C)

33.75 34.00 34.25 34.50 34.75 35.00 35.25

Salinity (PSU)

26 26.5 27

25.5

26

26.5

27

26.5

27

27.5

28

Float 0852 (All profiles as of 17 Aug 2014)