1408313949.5919028

24681012141618202224

Insitu Temperature (˚C)

33.6 34.0 34.4 34.8 35.2 35.6

Salinity (PSU)

26 26.5 27

23 23.5 24 24.5 25 25.5

26

26.5

27

24 24.5 25 25.5 26 26.5

27

27.5

Float 0041 (All profiles as of 17 Aug 2014)