1285679280.7784500

0100200300400500600700800900

1000

1100

Pressure (decibars)

32 33 34 35 36 37 38 Salinity (PSU)

-5 0 5 10 15 20 25 30 35

Insitu Temperature (˚C)

0 100 200 300 400

Oxygen Concentration (ml/l)

1650 1655 1660 1665 1670 1675 1680

Fluorescence Reference (counts)

0 200 400 600 800 1000

Fluorescence Signal (counts)

1190 1195 1200 1205 1210 1215 1220 1225

LSS Reference (counts)

0 100 200 300 400 500 600

LSS Signal (counts)

Float: 0004 Profile: 000 Location: 49.8˚N 49.7˚W Date: 11/30/2003

05101520253035

Insitu Temperature (˚C)

32 33 34 35 36 37 38

Salinity (PSU)