Park-Level Temperature Statistics (Float 5282)

0 50 100 150 200 250 Profile Number

1.00

1.25

1.50

1.75

2.00

2.25

2.50

T_{Mean} (˚C)

1.00

1.25

1.50

1.75

2.00

2.25

2.50

T_{Max} (˚C)

1.00

1.25

1.50

1.75

2.00

2.25

2.50

T_{Min} (˚C)

0.000

0.025

0.050

0.075

0.100

0.125

0.150

T_{StdDev} (˚C)

Park-Level Pressure Statistics (Float 5282)

0 50 100 150 200 250 Profile Number

840880920960

1000

1040

1080

P_{Mean} (dbar)

840880920960

1000

1040

1080

P_{Max} (dbar)

840880920960

1000

1040

1080

P_{Min} (dbar)

051015202530

P_{StdDev} (dbar)