1.565

1.570

1.575

1.580

1.585

1.590

1.595

1.600

Wake Cycles (x1000)

Time Series of Apf11 Coulomb Counter (Float 24583)

0.0 0.2 0.4 0.6 0.8 1.0 1.2 Profile Number

2.772.782.792.802.812.822.83

Charge Consumption (kC)

11.45

11.50

11.55

11.60

11.65

11.70

11.75

Sleep Period (Hours)

117.0

117.5

118.0

118.5

119.0

119.5

120.0

Wake Period (Minutes)