1.530

1.535

1.540

1.545

1.550

1.555

1.560

1.565

1.570

Wake Cycles (x1000)

Time Series of Apf11 Coulomb Counter (Float 24518)

0.0 0.2 0.4 0.6 0.8 1.0 1.2 Profile Number

1.981.992.002.012.02

Charge Consumption (kC)

11.85

11.90

11.95

12.00

12.05

12.10

12.15

Sleep Period (Hours)

70.50

70.75

71.00

71.25

71.50

71.75

72.00

72.25

Wake Period (Minutes)