Time Series of High Pressure Pump Time (Float 23962)

1170.8

1171.2

1171.6

1172.0

1172.4

1172.8

1173.2

Pumping Time (seconds)

0.0 0.2 0.4 0.6 0.8 1.0 Profile Number

As of 16 May 2025