Barometric/Pneumatic Pressure Time Series for Float 23867

0.0 0.2 0.4 0.6 0.8 1.0 1.2 Profile Number

120140160180200220

Barometric Pressure (counts)

120140160180200220

Pneumatic Pressure (counts)

As of 22 Jan 2026