1.710

1.715

1.720

1.725

1.730

1.735

1.740

1.745

1.750

Wake Cycles (x1000)

Time Series of Apf11 Coulomb Counter (Float 23867)

0.0 0.2 0.4 0.6 0.8 1.0 1.2 Profile Number

1.580

1.585

1.590

1.595

1.600

1.605

1.610

1.615

1.620

Charge Consumption (kC)

12.05

12.10

12.15

12.20

12.25

12.30

12.35

Sleep Period (Hours)

128.5

129.0

129.5

130.0

130.5

131.0

131.5

Wake Period (Minutes)