0.6400

0.6425

0.6450

0.6475

0.6500

0.6525

0.6550

Wake Cycles (x1000)

Time Series of Apf11 Coulomb Counter (Float 23753)

0.0 0.2 0.4 0.6 0.8 1.0 1.2 Profile Number

1.680

1.685

1.690

1.695

1.700

1.705

1.710

1.715

1.720

Charge Consumption (kC)

11.15

11.20

11.25

11.30

11.35

11.40

Sleep Period (Hours)

43.043.243.443.643.844.044.2

Wake Period (Minutes)