1.931.941.951.961.97

Wake Cycles (x1000)

Time Series of Apf11 Coulomb Counter (Float 23728)

0.0 0.2 0.4 0.6 0.8 1.0 1.2 Profile Number

1.680

1.685

1.690

1.695

1.700

1.705

1.710

1.715

1.720

Charge Consumption (kC)

12.60

12.65

12.70

12.75

12.80

12.85

12.90

Sleep Period (Hours)

128.5

129.0

129.5

130.0

130.5

131.0

131.5

Wake Period (Minutes)