Time Series of High Pressure Pump Time (Float 23610)

2182.0

2182.4

2182.8

2183.2

2183.6

2184.0

Pumping Time (seconds)

0.0 0.2 0.4 0.6 0.8 1.0 Profile Number

As of 05 Apr 2026