2.912.922.932.942.952.962.972.98

Wake Cycles (x1000)

Time Series of Apf11 Coulomb Counter (Float 23610)

0.0 0.2 0.4 0.6 0.8 1.0 1.2 Profile Number

4.244.264.284.304.324.344.36

Charge Consumption (kC)

12.05

12.10

12.15

12.20

12.25

12.30

12.35

Sleep Period (Hours)

142.5

143.0

143.5

144.0

144.5

145.0

145.5

146.0

Wake Period (Minutes)