2.122.132.142.152.162.17

Wake Cycles (x1000)

Time Series of Apf11 Coulomb Counter (Float 23455)

0.0 0.2 0.4 0.6 0.8 1.0 1.2 Profile Number

2.072.082.092.102.112.122.13

Charge Consumption (kC)

11.95

12.00

12.05

12.10

12.15

12.20

12.25

Sleep Period (Hours)

119.0

119.5

120.0

120.5

121.0

121.5

122.0

Wake Period (Minutes)