1.380

1.385

1.390

1.395

1.400

1.405

1.410

1.415

Wake Cycles (x1000)

Time Series of Apf11 Coulomb Counter (Float 23394)

0.0 0.2 0.4 0.6 0.8 1.0 1.2 Profile Number

2.672.682.692.702.712.722.73

Charge Consumption (kC)

10.92

10.96

11.00

11.04

11.08

11.12

11.16

11.20

Sleep Period (Hours)

108.0

108.4

108.8

109.2

109.6

110.0

110.4

Wake Period (Minutes)