0.05725

0.05750

0.05775

0.05800

0.05825

0.05850

0.05875

Wake Cycles (x1000)

Time Series of Apf11 Coulomb Counter (Float 23218)

0.0 0.2 0.4 0.6 0.8 1.0 1.2 Profile Number

0.888

0.892

0.896

0.900

0.904

0.908

0.912

Charge Consumption (kC)

2.442.452.462.472.482.492.50

Sleep Period (Hours)

36.736.836.937.037.137.237.337.437.537.6

Wake Period (Minutes)