2.142.152.162.172.182.19

Wake Cycles (x1000)

Time Series of Apf11 Coulomb Counter (Float 23186)

0.0 0.2 0.4 0.6 0.8 1.0 1.2 Profile Number

1.780

1.785

1.790

1.795

1.800

1.805

1.810

1.815

1.820

Charge Consumption (kC)

12.35

12.40

12.45

12.50

12.55

12.60

12.65

Sleep Period (Hours)

129.0

129.5

130.0

130.5

131.0

131.5

132.0

Wake Period (Minutes)