2.282.292.302.312.322.332.34

Wake Cycles (x1000)

Time Series of Apf11 Coulomb Counter (Float 22985)

0.0 0.2 0.4 0.6 0.8 1.0 1.2 Profile Number

2.172.182.192.202.212.222.23

Charge Consumption (kC)

12.95

13.00

13.05

13.10

13.15

13.20

13.25

13.30

Sleep Period (Hours)

138.0

138.5

139.0

139.5

140.0

140.5

141.0

Wake Period (Minutes)