1.501.752.002.252.502.753.00

Wake Cycles (x1000)

Time Series of Apf11 Coulomb Counter (Float 22835)

0.0 0.4 0.8 1.2 1.6 2.0 2.4 Profile Number

2.252.502.753.003.253.50

Charge Consumption (kC)

10.85

10.90

10.95

11.00

11.05

11.10

11.15

Sleep Period (Hours)

119120121122123124125126127

Wake Period (Minutes)