1.400

1.405

1.410

1.415

1.420

1.425

1.430

1.435

Wake Cycles (x1000)

Time Series of Apf11 Coulomb Counter (Float 22702)

0.0 0.2 0.4 0.6 0.8 1.0 1.2 Profile Number

1.881.891.901.911.92

Charge Consumption (kC)

12.90

12.95

13.00

13.05

13.10

13.15

13.20

Sleep Period (Hours)

63.00

63.25

63.50

63.75

64.00

64.25

64.50

Wake Period (Minutes)