2.142.152.162.172.182.19

Wake Cycles (x1000)

Time Series of Apf11 Coulomb Counter (Float 22653)

0.0 0.2 0.4 0.6 0.8 1.0 1.2 Profile Number

3.263.273.283.293.303.313.323.333.34

Charge Consumption (kC)

12.40

12.45

12.50

12.55

12.60

12.65

12.70

Sleep Period (Hours)

136.5

137.0

137.5

138.0

138.5

139.0

139.5

140.0

Wake Period (Minutes)