8.888.928.969.009.049.089.12

Wake Cycles (x1000)

Time Series of Apf11 Coulomb Counter (Float 22642)

0.0 0.5 1.0 1.5 2.0 2.5 3.0 3.5 Profile Number

6.825

6.850

6.875

6.900

6.925

6.950

6.975

Charge Consumption (kC)

241242243244245246247

Sleep Period (Hours)

77.50

77.75

78.00

78.25

78.50

78.75

79.00

79.25

Wake Period (Minutes)