Time Series of Electric Current Consumption (Float 22584)

0 2 4 6 8 10 12 Profile Number

0100200300400500600700

High Pressure Pump Current (mA) Air Pump Current (mA)

020406080100

SBE41cp Current (mA)

Quiescent Current (mA)