1.911.921.931.941.951.96

Wake Cycles (x1000)

Time Series of Apf11 Coulomb Counter (Float 22473)

0.0 0.2 0.4 0.6 0.8 1.0 1.2 Profile Number

2.272.282.292.302.312.322.33

Charge Consumption (kC)

12.35

12.40

12.45

12.50

12.55

12.60

12.65

Sleep Period (Hours)

72.00

72.25

72.50

72.75

73.00

73.25

73.50

73.75

Wake Period (Minutes)