6.225

6.250

6.275

6.300

6.325

6.350

6.375

Wake Cycles (x1000)

Time Series of Apf11 Coulomb Counter (Float 22274)

0.0 0.2 0.4 0.6 0.8 1.0 1.2 Profile Number

7.325

7.350

7.375

7.400

7.425

7.450

7.475

Charge Consumption (kC)

11.40

11.45

11.50

11.55

11.60

11.65

11.70

Sleep Period (Hours)

143.5

144.0

144.5

145.0

145.5

146.0

146.5

147.0

Wake Period (Minutes)