01020304050

Wake Cycles (x1000)

Time Series of Apf11 Coulomb Counter (Float 22248)

0 5 10 15 20 25 30 35 40 Profile Number

05101520253035

Charge Consumption (kC)

050100150200250

Sleep Period (Hours)

65707580859095100105

Wake Period (Minutes)