1.195

1.200

1.205

1.210

1.215

1.220

1.225

Wake Cycles (x1000)

Time Series of Apf11 Coulomb Counter (Float 22035)

0.0 0.2 0.4 0.6 0.8 1.0 1.2 Profile Number

1.485

1.490

1.495

1.500

1.505

1.510

1.515

Charge Consumption (kC)

11.75

11.80

11.85

11.90

11.95

12.00

12.05

Sleep Period (Hours)

69.25

69.50

69.75

70.00

70.25

70.50

70.75

Wake Period (Minutes)